Wire

0 10 20 30 40 50 60 0

1

Wire

0 10 20 30 40 50 60 0

1

Wire

0 10 20 30 40 50 60 0

1

Wire

0 10 20 30 40 50 60 0

1

Wire

0 10 20 30 40 50 60 0

1

Wire

0 10 20 30 40 50 60 0

1

0 10 20 30 40 50 60 70 0 50 100 150 200 250 300 350

0 ALCT raw hits

0 10 20 30 40 50 60 70 0

50

100

150

200

250

300

350

0

0 10 20 30 40 50 60 70 0

50

100

150

200

250

300

350

0

0 10 20 30 40 50 60 70 0

50

100

150

200

250

300

350

0

0 10 20 30 40 50 60 70 0

50

100

150

200

250

300

350

0

0 10 20 30 40 50 60 70 0

50

100

150

200

250

300

350

0

Swtd Cap, CLCT bits, Best Muon vs. Position

0

1

0

1

0

1

0

1

0

1

0

1

0 0

0 0

0 0

0 0

0 0

0 0