High Voltage (V)

3400 3450 3500 3550 3600

ALCT Efficiency (%)

99

99.2

99.4

99.6

99.8

100

100.2

100.4

100.6

100.8

101

Comp. Threshold 30 mV 40 mV 50 mV

Chamber 1

High Voltage (V)

3400 3450 3500 3550 3600

ALCT Efficiency (%)

99

99.2

99.4

99.6

99.8

100

100.2

100.4

100.6

100.8

101

Comp. Threshold 30 mV 40 mV 50 mV

Chamber 2

ALCT Efficiency vs. High Voltage