Mon Jun 2 20:36:11 2003

HalfStrip vs HalfStrip

Chamber 1

0 20 40 60 80 100 120 140 160

Chamber 2

0 20 40 60 80 100 120 140 160

Chamber 1

100 105 110 115 120 125

Chamber 2

45

50

55

60

65

70