CFEB vs. Position CFEB vs. Time

0 10 20 30 40 50 60 70 0

50

100

150

200

250

0 0 5 10 15 20 25 30 0

50

100

150

200

250

0

0 10 20 30 40 50 60 70 0

50

100

150

200

250

0 0 5 10 15 20 25 30 0

50

100

150

200

250

0

0 10 20 30 40 50 60 70 0

50

100

150

200

250

0 0 5 10 15 20 25 30 0

50

100

150

200

250

0

0 10 20 30 40 50 60 70 0

50

100

150

200

250

0 0 5 10 15 20 25 30 0

50

100

150

200

250

0

0 10 20 30 40 50 60 70 0

50

100

150

200

250

0 0 5 10 15 20 25 30 0

50

100

150

200

250

0

0 10 20 30 40 50 60 70 0

50

100

150

200

250

0 0 5 10 15 20 25 30 0

50

100

150

200

250

0

0 0 0 0

0 0 0 0

0 0 0 0

0 0 0 0

0 0 0 0

0 0 0 0

CFEB vs. Position CFEB vs. Time

0 10 20 30 40 50 60 70 0 20 40 60 80 100 120 140 160 180 200 220

0 0 5 10 15 20 25 30 0 20 40 60 80 100 120 140 160 180 200 220

0

0 10 20 30 40 50 60 70 0 20 40 60 80 100 120 140 160 180 200 220

0 0 5 10 15 20 25 30 0 20 40 60 80 100 120 140 160 180 200 220

0

0 10 20 30 40 50 60 70 0 20 40 60 80 100 120 140 160 180 200 220

0 0 5 10 15 20 25 30 0 20 40 60 80 100 120 140 160 180 200 220

0

0 10 20 30 40 50 60 70 0 20 40 60 80 100 120 140 160 180 200 220

0 0 5 10 15 20 25 30 0 20 40 60 80 100 120 140 160 180 200 220

0

0 10 20 30 40 50 60 70 0 20 40 60 80 100 120 140 160 180 200 220

0 0 5 10 15 20 25 30 0 20 40 60 80 100 120 140 160 180 200 220

0

0 10 20 30 40 50 60 70 0 20 40 60 80 100 120 140 160 180 200 220

0 0 5 10 15 20 25 30 0 20 40 60 80 100 120 140 160 180 200 220

0

0 0 0 0

0 0 0 0

0 0 0 0

0 0 0 0

0 0 0 0

0 0 0 0

0 0 0 0

0 0 0 0

0 0 0 0

0 0 0 0

0 0 0 0

0 0 0 0